<!--
 * @Author: qinzhenpen qzp1807@126.com
 * @Date: 2024-08-16 09:16:26
 * @LastEditors: qinzhenpen qzp1807@126.com
 * @LastEditTime: 2024-08-16 09:18:05
 * @FilePath: \vue3\src\views\visual-analysis\index.vue
 * @Description: 这是默认设置,请设置`customMade`, 打开koroFileHeader查看配置 进行设置: https://github.com/OBKoro1/koro1FileHeader/wiki/%E9%85%8D%E7%BD%AE
-->
<template>
 <div>
  <iframe src="http://118.31.7.2:96" width="100%" height="900" scrolling="no" frameborder="0"></iframe>
 </div>
</template>
<script setup>

</script>
<style lang='scss'  scoped>
        
</style>