<!--
 * @Author: qinzhenpen qzp1807@126.com
 * @Date: 2024-08-16 09:16:26
 * @LastEditors: qinzhenpen qzp1807@126.com
 * @LastEditTime: 2025-05-13 10:23:07
 * @FilePath: \vue3\src\views\visual-analysis\index.vue
 * @Description: 这是默认设置,请设置`customMade`, 打开koroFileHeader查看配置 进行设置: https://github.com/OBKoro1/koro1FileHeader/wiki/%E9%85%8D%E7%BD%AE
-->
<template>
  <div class="el-Aitools">
    <iframe id="iframe" src="https://dshlw.sztzjy.com:196" width="100%" height="100%" frameborder="1"></iframe>
  </div>
</template>
<script setup></script>
<style lang="scss" scoped>
.el-Aitools {
  position: relative;
  padding: 20px 20px 0;
  min-height: calc(100vh - 58px);
  #iframe {
    position: absolute;
    top: 0;
    left: 0;
    width: 100%;
    height: 100%;
    border: none;
  }
}
</style>
